Proportion of dynamic devices (%)

0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

Gain compared to random channel selection

-0.02 0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16 Optimal strategy UCB_1, α =0.5 Thomson-sampling